en	LinkValidator

en	Link check

en	Link check of page "%s"

en	Internal Links

en	File Links

en	External Links

en	Depth

en	Refresh display

en	Check links

en	Configuration

en	Listing of broken links

en	Error message

en	Field

en	Last check

en	Link target

en	Link text

en	Link type

en	Located on page / folder

en	Parent page / folder

en	Record

en	Table

en	Title

en	Uid

en	Records

en	Records

en	Edit record containing this broken link

en	Edit only the field containing this broken link

en	Display information

en	[No value]

en	Page '###title###' (id=###uid###) is deleted.

en	Page '###title###' (id=###uid###) is not visible.

en	Page (id=###uid###) does not exist.

en	Record '###title###' (id=###uid###) is not located on page ###wrongpage###, but on page ###rightpage###.

en	Record '###title###' (id=###uid###) is deleted.

en	Record '###title###' (id=###uid###) is not visible.

en	Record (id=###uid###) does not exist.

en	No information about the error is available.

en	A redirect loop occurred. (%s: %s)

en	Too many redirects.

en	File doesn't exist.

en	External link is broken.

en	Could not resolve host. The given remote host was not resolved.

en	Failure with receiving network data.

en	An error occurred (%s): "%s".

en	Exception: %s

en	Network error / invalid domain

en	Multiple Choices (300).

en	Use proxy (305).

en	Accessing this address is not allowed (403).

en	The requested URL was not found (404).

en	Internal Server Error (500)

en	External Link returned HTTP error code (%s).

en	Unsupported protocol.

en	Initialization failed.

en	The URL was not properly formatted.

en	Feature not supported.

en	Couldn't resolve proxy.

en	Couldn't resolve host.

en	Failed to connect to host or proxy.

en	The remote server sent data that could not be parsed.

en	Access denied.

en	Generic HTTP/2 error.

en	A file transfer was shorter or larger than expected.

en	Timeout: The remote server possibly took too long to answer.

en	Problem with SSl / TLS handshake.

en	Too many redirects.

en	General network error. Send failed.

en	General network error. Receive failed.

en	The remote server's SSL certificate was deemed not OK.

en	Maximum file size exceeded.

en	Ok

en	%1$s %2$s

en	No broken links found

en	There are no broken links for the selected link type restriction.

en	No access!

en	You do not have access to these listings.

en	Checking links, please stand by.

en	Refreshing link list, please stand by.

en	Needs recheck

en	Please select a page in the page tree.

en	Broken link

en	Broken link: "%s"

en	Link properties

en	Record information