en	Debug

en	(%1$u Errors/Warnings, SQL: %2$ux / %3$u ms)

en	Log

en	Log Message

en	Component

en	Level

en	Group by Component

en	Group by Level

en	Display only levels equal or higher to

en	No log entries.

en	Events

en	Query Information

en	Query

en	Queries

en	Backtrace

en	SQL Debug

en	SQL Query

en	Count

en	Total Time [ms]

en	Total

en	Page title

en	Used provider

en	Title

en	Provider

en	Skipped providers (provided no title)

en	Name

en	All providers checked in order

en	It's not possible to retrieve the page title (providers) information when the page is cached.

en	Visit this page uncached, or disable the cache through this admin panel.

en	Event class name

en	Dispatch count (%1d)